<template>
  <div class="verification-processing">
    <h1 class="mb-56">
      We process your data
    </h1>

    <UiAlert
      size="large"
      class="mb-40"
    >
      The verification status of your documents will be displayed here. It usually takes 1-2 business days.
      <br> <br>
      Also, at the end of the verification, we will send a notification
      to the mail john@gmail.com
    </UiAlert>

    <UiButton
      size="large"
      class="w-100"
      href="/projects"
    >
      {{ $t('to_main') }}
    </UiButton>
  </div>
</template>

<script setup>
definePageMeta({
  middleware: ['auth'],
  centerContent: true,
});
</script>

<style lang="scss">
.verification-processing{
  margin: 0 auto;
  width: 513px;
}
</style>
