/*
  Warnings:

  - Added the required column `volumes` to the `UserPreferences` table without a default value. This is not possible if the table is not empty.

*/
-- RedefineTables
PRAGMA defer_foreign_keys=ON;
PRAGMA foreign_keys=OFF;
CREATE TABLE "new_UserPreferences" (
    "userId" TEXT NOT NULL PRIMARY KEY,
    "toggleInputHotkey" TEXT NOT NULL,
    "toggleOutputHotkey" TEXT NOT NULL,
    "volumes" JSONB NOT NULL,
    CONSTRAINT "UserPreferences_userId_fkey" FOREIGN KEY ("userId") REFERENCES "User" ("id") ON DELETE CASCADE ON UPDATE CASCADE
);
INSERT INTO "new_UserPreferences" ("toggleInputHotkey", "toggleOutputHotkey", "userId") SELECT "toggleInputHotkey", "toggleOutputHotkey", "userId" FROM "UserPreferences";
DROP TABLE "UserPreferences";
ALTER TABLE "new_UserPreferences" RENAME TO "UserPreferences";
PRAGMA foreign_keys=ON;
PRAGMA defer_foreign_keys=OFF;
